==== Gb/NS Timer configuration

The NS protocol features a number of configurable timers.

.List of configurable NS timers
|===
|tns-block|(un)blocking timer timeout (secs)
|tns-block-retries|(un)blocking timer; number of retries
|tns-reset|reset timer timeout (secs)
|tns-reset-retries|reset timer; number of retries
|tns-test|test timer timeout (secs)
|tns-alive|alive timer timeout (secs)
|tns-alive-retries|alive timer; number of retries
|tsns-prov|SNS provision timeout (secs) used by all SNS auto configuration procedures.
|tsns-size-retries|SNS Size procedure; number of retries
|tsns-config-retries|SNS Config procedure; number of retries
|===

All timer can be configured by vty configuration

.Example of timeouts
----
ns
 timer tns-block 3
 timer tns-block-retries 3
 timer tns-reset 3
 timer tns-reset-retries 3
 timer tns-test 30
 timer tns-alive 3
 timer tns-alive-retries 10
 timer tsns-prov 10
 timer tsns-size-retries 3
 timer tsns-config-retries 3
----

// FIXME: ladder diagrams for every timer
