:gfdl-enabled:

OsmoBSC User Manual
===================
Harald Welte <hwelte@sysmocom.de>


include::./common/chapters/preface.adoc[]

include::{srcdir}/chapters/overview.adoc[]

include::{srcdir}/chapters/running.adoc[]

include::{srcdir}/chapters/control.adoc[]

include::{srcdir}/chapters/counters.adoc[]

include::{srcdir}/chapters/handover.adoc[]

include::./common/chapters/vty.adoc[]

include::./common/chapters/logging.adoc[]

include::./common/chapters/bts.adoc[]

include::{srcdir}/chapters/bts-examples.adoc[]

include::./common/chapters/bsc.adoc[]

include::./common/chapters/abis.adoc[]

include::./common/chapters/control_if.adoc[]

include::./common/chapters/cell-broadcast.adoc[]

include::./common/chapters/port_numbers.adoc[]

include::./common/chapters/bibliography.adoc[]

include::./common/chapters/glossary.adoc[]

include::./common/chapters/gfdl.adoc[]

